-0.2 0.0 0.2

-0.2 0.0 0.2

-1000 0 1000

-0.2 0.0 0.2

-0.2 0.0 0.2

-1000 0 1000

-0.2 0.0 0.2

-1000 0 1000

-0.2 0.0 0.2

-1000 0 1000

-0.2 0.0 0.2

0 5 10 15

(e)

(c)

(b)

P (%)

GaAs (a)

2

m

5 5

6

m

6

m

2

m

2

m

10

m

P (%)

5

B_y (Gauss)

P (%)

P (%)

3% In

B_y (Gauss)

P (%)

B_y (Gauss)

P (%)

5% In

(d) 2

m

6% In

P (%)

B_y (Gauss)

P (arb. units)

Position (

m)

GaAs 3% 5% 6%