2000 3000 4000 -5 0 5 10 15

0 50 100 150 200 0 5 10 15 20

SH (^{-1}m^{-1})

Conductivity (

-1m^{-1})

(a)

S_H (^{-1}m^{-1})

Temperature (K)

(b)